Elevate your swimming experience with Aquavic swimming pool ionisers

Enjoy cleaner, clearer water while reducing chemicals for a healthier swim. Make the switch today and dive into a more eco-friendly pool solution.

Swimming pool ionisers, as we know them today, made their way across the Indian Ocean from South Africa in the 1960s. So well were they received that some manufacturers began offering their own versions. Aquavic recognised the advantages and began to develop their version.

“The heart of all ionisers are the sacrificial anodes, but the prohibitive cost of the alloy was their Achilles heel,” explains John R. Horwood, director of Aquavic. “By late 2023 we were considering whether we should concentrate only on the industrial arm of our business until a light-bulb moment caused us to revisit our archives — and the next generation of ionisers was born.

“Trials of the new system, both here and overseas, began in 2023, and when the data were analysed, the numbers confirmed the new variant outperformed the old by a significant margin.

“To support our findings, we offer a live copy of a Performance Comparison Chart to interested parties,” adds John. To obtain your copy, and to do your own in-house assessment, contact Aquavic.

Company profile

Aquavic
aquavic@optusnet.com.au
P: 03 9723 4223
M: 0401 691 984

The post Elevate your swimming experience with Aquavic swimming pool ionisers appeared first on Completehome.